From 9f87207d668fbe0a2039c63803128fbe5916f993 Mon Sep 17 00:00:00 2001
From: kamtschatka <simon.schatka@gmx.at>
Date: Sat, 12 Oct 2024 15:27:21 +0200
Subject: feature: Allow to disable default password login after SSO is
 configured. Fixes #406 (#502)

* [Feature Request] Allow to disable default password log in after SSO is configured #406
changed the flag to also disallow logging in via password
The extensions will also no longer be allowed to log in via username/password then

* [Feature Request] Allow to disable default password log in after SSO is configured #406
added the error message for OAuth
---
 apps/browser-extension/src/SignInPage.tsx | 6 +-----
 1 file changed, 1 insertion(+), 5 deletions(-)

(limited to 'apps/browser-extension/src/SignInPage.tsx')

diff --git a/apps/browser-extension/src/SignInPage.tsx b/apps/browser-extension/src/SignInPage.tsx
index f1899d5a..1d849028 100644
--- a/apps/browser-extension/src/SignInPage.tsx
+++ b/apps/browser-extension/src/SignInPage.tsx
@@ -80,11 +80,7 @@ export default function SignInPage() {
       break;
   }
   if (loginError) {
-    if (loginError.data?.code == "UNAUTHORIZED") {
-      errorMessage = "Wrong username or password";
-    } else {
-      errorMessage = loginError.message;
-    }
+    errorMessage = loginError.message || "Wrong username or password";
   }
 
   return (
-- 
cgit v1.2.3-70-g09d2

