From 5f07b5075dd45b4b0f4ab35ee70412f11177eff4 Mon Sep 17 00:00:00 2001
From: Landon Epps <landon.epps@gmail.com>
Date: Wed, 20 Aug 2025 04:50:12 -0400
Subject: fix(mobile): fix WebView deceleration rate on iOS (#1835)

The mobile app uses a WebView to display the bookmark preview.
WebView on iOS has a "fast" deceleration rate by default, which is much slower than the system default.
We should update it to "normal" to match the non-WebView screens in the app.
---
 apps/mobile/components/bookmarks/BookmarkLinkPreview.tsx | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'apps/mobile/components/bookmarks/BookmarkLinkPreview.tsx')

diff --git a/apps/mobile/components/bookmarks/BookmarkLinkPreview.tsx b/apps/mobile/components/bookmarks/BookmarkLinkPreview.tsx
index 03999c3e..443d6284 100644
--- a/apps/mobile/components/bookmarks/BookmarkLinkPreview.tsx
+++ b/apps/mobile/components/bookmarks/BookmarkLinkPreview.tsx
@@ -112,6 +112,7 @@ export function BookmarkLinkReaderPreview({
         }}
         showsVerticalScrollIndicator={false}
         showsHorizontalScrollIndicator={false}
+        decelerationRate="normal"
       />
     </View>
   );
@@ -145,6 +146,7 @@ export function BookmarkLinkArchivePreview({
       startInLoadingState={true}
       mediaPlaybackRequiresUserAction={true}
       source={webViewUri}
+      decelerationRate="normal"
     />
   );
 }
-- 
cgit v1.2.3-70-g09d2

