From 04572a8e5081b1e4871e273cde9dbaaa44c52fe0 Mon Sep 17 00:00:00 2001
From: MohamedBassem <me@mbassem.com>
Date: Wed, 13 Mar 2024 21:43:44 +0000
Subject: structure: Create apps dir and copy tooling dir from t3-turbo repo

---
 apps/mobile/lib/providers.tsx | 54 +++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 54 insertions(+)
 create mode 100644 apps/mobile/lib/providers.tsx

(limited to 'apps/mobile/lib/providers.tsx')

diff --git a/apps/mobile/lib/providers.tsx b/apps/mobile/lib/providers.tsx
new file mode 100644
index 00000000..1717afb2
--- /dev/null
+++ b/apps/mobile/lib/providers.tsx
@@ -0,0 +1,54 @@
+import { QueryClient, QueryClientProvider } from "@tanstack/react-query";
+import { httpBatchLink } from "@trpc/client";
+import { useEffect, useState } from "react";
+import superjson from "superjson";
+
+import useAppSettings, { getAppSettings } from "./settings";
+import { api } from "./trpc";
+
+import { ToastProvider } from "@/components/ui/Toast";
+
+function getTRPCClient(address: string) {
+  return api.createClient({
+    links: [
+      httpBatchLink({
+        url: `${address}/api/trpc`,
+        async headers() {
+          const settings = await getAppSettings();
+          return {
+            Authorization:
+              settings && settings.apiKey
+                ? `Bearer ${settings.apiKey}`
+                : undefined,
+          };
+        },
+        transformer: superjson,
+      }),
+    ],
+  });
+}
+
+export function Providers({ children }: { children: React.ReactNode }) {
+  const { settings } = useAppSettings();
+  const [queryClient] = useState(() => new QueryClient());
+
+  const [trpcClient, setTrpcClient] = useState<
+    ReturnType<typeof getTRPCClient>
+  >(getTRPCClient(settings.address));
+
+  useEffect(() => {
+    setTrpcClient(getTRPCClient(settings.address));
+  }, [settings.address]);
+
+  return (
+    <api.Provider
+      key={settings.address}
+      client={trpcClient}
+      queryClient={queryClient}
+    >
+      <QueryClientProvider client={queryClient}>
+        <ToastProvider>{children}</ToastProvider>
+      </QueryClientProvider>
+    </api.Provider>
+  );
+}
-- 
cgit v1.2.3-70-g09d2

