From 30c8bc394100f2348a1f9c193036f95e045d4d6d Mon Sep 17 00:00:00 2001
From: MohamedBassem <me@mbassem.com>
Date: Fri, 29 Mar 2024 21:33:15 +0000
Subject: fix(web): Consistent spacing in the content container in all pages.
 Fixes #40

---
 apps/web/app/dashboard/admin/page.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/web/app/dashboard/admin/page.tsx')

diff --git a/apps/web/app/dashboard/admin/page.tsx b/apps/web/app/dashboard/admin/page.tsx
index c44d3142..eb80cb03 100644
--- a/apps/web/app/dashboard/admin/page.tsx
+++ b/apps/web/app/dashboard/admin/page.tsx
@@ -191,7 +191,7 @@ export default function AdminPage() {
   }
 
   return (
-    <div className="m-4 flex flex-col gap-5 rounded-md border bg-background p-4">
+    <div className="flex flex-col gap-5 rounded-md border bg-background p-4">
       <p className="text-2xl">Admin</p>
       <Separator />
       <ServerStatsSection />
-- 
cgit v1.3-1-g0d28

