From 30c8bc394100f2348a1f9c193036f95e045d4d6d Mon Sep 17 00:00:00 2001
From: MohamedBassem <me@mbassem.com>
Date: Fri, 29 Mar 2024 21:33:15 +0000
Subject: fix(web): Consistent spacing in the content container in all pages.
 Fixes #40

---
 apps/web/app/dashboard/lists/page.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/web/app/dashboard/lists/page.tsx')

diff --git a/apps/web/app/dashboard/lists/page.tsx b/apps/web/app/dashboard/lists/page.tsx
index d379b1bb..f839ca80 100644
--- a/apps/web/app/dashboard/lists/page.tsx
+++ b/apps/web/app/dashboard/lists/page.tsx
@@ -6,7 +6,7 @@ export default async function ListsPage() {
   const lists = await api.lists.list();
 
   return (
-    <div className="container mt-4 flex flex-col gap-3">
+    <div className="flex flex-col gap-3">
       <p className="text-2xl">📋 All Lists</p>
       <Separator />
       <AllListsView initialData={lists.lists} />
-- 
cgit v1.2.3-70-g09d2

