From eb7da996a7c2d617d276f296cac07a6fd5648664 Mon Sep 17 00:00:00 2001
From: Mohamed Bassem <me@mbassem.com>
Date: Sun, 27 Oct 2024 12:03:14 +0000
Subject: ui: Redesign the settings page and move it to its own layout

---
 apps/web/components/dashboard/sidebar/AllLists.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/web/components/dashboard/sidebar/AllLists.tsx')

diff --git a/apps/web/components/dashboard/sidebar/AllLists.tsx b/apps/web/components/dashboard/sidebar/AllLists.tsx
index b6cadea9..c48ddb0f 100644
--- a/apps/web/components/dashboard/sidebar/AllLists.tsx
+++ b/apps/web/components/dashboard/sidebar/AllLists.tsx
@@ -3,6 +3,7 @@
 import { useCallback } from "react";
 import Link from "next/link";
 import { usePathname } from "next/navigation";
+import SidebarItem from "@/components/shared/sidebar/SidebarItem";
 import { Button } from "@/components/ui/button";
 import { CollapsibleTriggerTriangle } from "@/components/ui/collapsible";
 import { MoreHorizontal, Plus } from "lucide-react";
@@ -13,7 +14,6 @@ import { ZBookmarkListTreeNode } from "@hoarder/shared/utils/listUtils";
 import { CollapsibleBookmarkLists } from "../lists/CollapsibleBookmarkLists";
 import { EditListModal } from "../lists/EditListModal";
 import { ListOptions } from "../lists/ListOptions";
-import SidebarItem from "./SidebarItem";
 
 export default function AllLists({
   initialData,
-- 
cgit v1.2.3-70-g09d2

