From 789188b522c0570b092f588209c4f0d270b703e3 Mon Sep 17 00:00:00 2001
From: Evan Frenkel <3375094+evan6seven@users.noreply.github.com>
Date: Sun, 18 Jan 2026 05:14:22 -0800
Subject: fix(web): avoid masonry overflow in bookmark grids (#2400)

---
 apps/web/components/public/lists/PublicBookmarkGrid.tsx | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'apps/web/components/public/lists/PublicBookmarkGrid.tsx')

diff --git a/apps/web/components/public/lists/PublicBookmarkGrid.tsx b/apps/web/components/public/lists/PublicBookmarkGrid.tsx
index d6aa9875..18e42baa 100644
--- a/apps/web/components/public/lists/PublicBookmarkGrid.tsx
+++ b/apps/web/components/public/lists/PublicBookmarkGrid.tsx
@@ -227,7 +227,11 @@ export default function PublicBookmarkGrid({
   }, [data]);
   return (
     <>
-      <Masonry className="flex gap-4" breakpointCols={breakpointConfig}>
+      <Masonry
+        className="-ml-4 flex w-auto"
+        columnClassName="pl-4"
+        breakpointCols={breakpointConfig}
+      >
         {bookmarks.map((bookmark) => (
           <BookmarkCard key={bookmark.id} bookmark={bookmark} />
         ))}
-- 
cgit v1.2.3-70-g09d2

