From f7f577af54dd704656f978bf392b203f216c6a98 Mon Sep 17 00:00:00 2001
From: Mohamed Bassem <me@mbassem.com>
Date: Mon, 7 Jul 2025 00:26:50 +0000
Subject: fix: Drop the need to for the self-call for providers and
 NEXTAUTH_INTERNAL_URL

---
 apps/web/components/signin/SignInProviderButton.tsx | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

(limited to 'apps/web/components/signin/SignInProviderButton.tsx')

diff --git a/apps/web/components/signin/SignInProviderButton.tsx b/apps/web/components/signin/SignInProviderButton.tsx
index 0f208397..e866c878 100644
--- a/apps/web/components/signin/SignInProviderButton.tsx
+++ b/apps/web/components/signin/SignInProviderButton.tsx
@@ -1,13 +1,15 @@
 "use client";
 
-import type { ClientSafeProvider } from "next-auth/react";
 import { Button } from "@/components/ui/button";
 import { signIn } from "next-auth/react";
 
 export default function SignInProviderButton({
   provider,
 }: {
-  provider: ClientSafeProvider;
+  provider: {
+    id: string;
+    name: string;
+  };
 }) {
   return (
     <Button
-- 
cgit v1.2.3-70-g09d2

