From 9f87207d668fbe0a2039c63803128fbe5916f993 Mon Sep 17 00:00:00 2001
From: kamtschatka <simon.schatka@gmx.at>
Date: Sat, 12 Oct 2024 15:27:21 +0200
Subject: feature: Allow to disable default password login after SSO is
 configured. Fixes #406 (#502)

* [Feature Request] Allow to disable default password log in after SSO is configured #406
changed the flag to also disallow logging in via password
The extensions will also no longer be allowed to log in via username/password then

* [Feature Request] Allow to disable default password log in after SSO is configured #406
added the error message for OAuth
---
 apps/web/lib/clientConfig.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'apps/web/lib/clientConfig.tsx')

diff --git a/apps/web/lib/clientConfig.tsx b/apps/web/lib/clientConfig.tsx
index 90e6d35c..c5d206e3 100644
--- a/apps/web/lib/clientConfig.tsx
+++ b/apps/web/lib/clientConfig.tsx
@@ -6,7 +6,7 @@ export const ClientConfigCtx = createContext<ClientConfig>({
   demoMode: undefined,
   auth: {
     disableSignups: false,
-    disablePasswordSignups: false,
+    disablePasswordAuth: false,
   },
   inference: {
     inferredTagLang: "english",
-- 
cgit v1.2.3-70-g09d2

